-- ============================================
-- SecMPS v2.0 数据库建表脚本（8张表）
-- 数据库: gljs_main
-- 点位=子设备, 通过 Base_Device.ParentDeviceId 级联
-- ============================================

USE gljs_main;

-- ============================================
-- 1. 统一设备主表
-- 采集器/摄像机=父设备(IsParent=1)  探头/通道=子设备(ParentDeviceId)
-- ============================================
DROP TABLE IF EXISTS Base_Device;
CREATE TABLE Base_Device (
    DeviceId        INT AUTO_INCREMENT COMMENT '设备ID',
    DeviceName      NVARCHAR(100) NOT NULL COMMENT '设备名称',
    AdapterCode     NVARCHAR(50) NOT NULL COMMENT '来源适配器',
    SourceId        NVARCHAR(100) NOT NULL COMMENT '源系统设备ID',
    DeviceCategory  INT NOT NULL DEFAULT 1 COMMENT '设备大类(1视频/2IoT/3门禁/4道闸/5报警)',
    RegionId        INT NULL COMMENT '所属区域ID',
    GatewayNodeId   INT NULL COMMENT '所属网关节点ID',
    IsParent        TINYINT NOT NULL DEFAULT 0 COMMENT '是否父设备(0叶子/1可展开)',
    ParentDeviceId  INT NULL COMMENT '父设备ID(自引用,子设备挂父设备下)',
    IsOnline        TINYINT NOT NULL DEFAULT 0 COMMENT '在线状态(0离线/1在线)',
    IpAddress       NVARCHAR(50) COMMENT 'IP地址',
    Port            INT COMMENT '端口',
    Location        NVARCHAR(200) COMMENT '安装位置',
    Lat             DOUBLE COMMENT '纬度',
    Lng             DOUBLE COMMENT '经度',
    MapModelId      NVARCHAR(100) COMMENT '三维地图模型ID',
    MapModelScale   FLOAT DEFAULT 1.0 COMMENT '模型缩放比例',
    MapModelRotation NVARCHAR(100) COMMENT '模型旋转角度(JSON)',
    ExtraData       TEXT COMMENT '源系统原始数据JSON',
    LocalOverrides  TEXT COMMENT '本地覆盖字段JSON',
    SyncVersion     BIGINT DEFAULT 0 COMMENT '同步版本号',
    LastSyncTime    DATETIME COMMENT '上次同步时间',
    Enable          TINYINT DEFAULT 1 COMMENT '启用(0禁用/1启用)',
    Remark          NVARCHAR(500) COMMENT '备注',
    CreateID        INT COMMENT '创建人ID',
    Creator         NVARCHAR(50) COMMENT '创建人',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    ModifyID        INT COMMENT '修改人ID',
    Modifier        NVARCHAR(50) COMMENT '修改人',
    ModifyDate      DATETIME COMMENT '修改时间',
    PRIMARY KEY (DeviceId),
    INDEX IX_Sync (AdapterCode, SourceId),
    INDEX IX_Region (RegionId),
    INDEX IX_Parent (ParentDeviceId),
    INDEX IX_Category (DeviceCategory),
    INDEX IX_Gateway (GatewayNodeId)
) COMMENT '统一设备主表';

-- ============================================
-- 2. 视频设备扩展表
-- DeviceId(INT) → Base_Device.DeviceId
-- ============================================
DROP TABLE IF EXISTS Device_Video_Ext;
CREATE TABLE Device_Video_Ext (
    ExtId           INT AUTO_INCREMENT COMMENT '扩展记录ID',
    DeviceId        INT NOT NULL COMMENT '关联设备ID',
    OwlDeviceId     NVARCHAR(64) NOT NULL COMMENT 'Owl系统设备ID',
    Protocol        INT DEFAULT 1 COMMENT '接入协议',
    Manufacturer    NVARCHAR(100) COMMENT '厂商',
    Model           NVARCHAR(100) COMMENT '设备型号',
    ChannelCount    INT DEFAULT 0 COMMENT '通道数量',
    OwlStatus       NVARCHAR(500) COMMENT 'Owl原始状态JSON',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    PRIMARY KEY (ExtId),
    INDEX IX_Device (DeviceId),
    INDEX IX_Owl (OwlDeviceId)
) COMMENT '视频设备扩展表';

-- ============================================
-- 3. 视频通道扩展表
--   存Owl通道的流地址/云台/录像能力等扩展信息
--   DeviceId(INT) → Base_Device.DeviceId（一台NVR可有多条通道记录，对应不同码流）
-- ============================================
DROP TABLE IF EXISTS Video_Channel;
CREATE TABLE Video_Channel (
    ChannelId       INT AUTO_INCREMENT COMMENT '通道记录ID',
    OwlChannelId    NVARCHAR(64) NOT NULL COMMENT 'Owl系统通道ID',
    DeviceId        INT NOT NULL COMMENT '关联Base_Device设备ID',
    OwlStreamApp    NVARCHAR(50) COMMENT 'Owl流应用名',
    OwlStreamName   NVARCHAR(100) COMMENT 'Owl流名称',
    HasPtz          TINYINT DEFAULT 0 COMMENT '是否支持云台',
    HasRecording    TINYINT DEFAULT 0 COMMENT '是否支持录像',
    RecordMode      INT DEFAULT 0 COMMENT '录像模式',
    SnapshotUrl     NVARCHAR(500) COMMENT '快照地址',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    PRIMARY KEY (ChannelId),
    INDEX IX_Device (DeviceId),
    INDEX IX_Owl (OwlChannelId)
) COMMENT '视频通道扩展表';

-- ============================================
-- 4. 录像记录表
-- ChannelId(INT) → Video_Channel.ChannelId
-- ============================================
DROP TABLE IF EXISTS Video_Record;
CREATE TABLE Video_Record (
    RecordId        INT AUTO_INCREMENT COMMENT '录像记录ID',
    ChannelId       INT NOT NULL COMMENT '关联通道ID',
    OwlRecordId     INT NOT NULL COMMENT 'Owl录像记录ID',
    App             NVARCHAR(50) COMMENT '应用名',
    Stream          NVARCHAR(100) COMMENT '流ID',
    StartedAt       DATETIME NOT NULL COMMENT '录像开始时间',
    EndedAt         DATETIME COMMENT '录像结束时间',
    Duration        DOUBLE DEFAULT 0 COMMENT '录像时长(秒)',
    FilePath        NVARCHAR(500) COMMENT '文件路径',
    FileSize        BIGINT DEFAULT 0 COMMENT '文件大小(字节)',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    PRIMARY KEY (RecordId),
    INDEX IX_Channel (ChannelId),
    INDEX IX_Time (StartedAt)
) COMMENT '录像记录表';

-- ============================================
-- 5. IoT设备扩展表（含点位属性）
-- DeviceId(INT) → Base_Device.DeviceId
-- 子设备(点位)的额外属性: PointIndex/Unit/IsControlPoint
-- ============================================
DROP TABLE IF EXISTS Device_IoT_Ext;
CREATE TABLE Device_IoT_Ext (
    ExtId           INT AUTO_INCREMENT COMMENT '扩展记录ID',
    DeviceId        INT NOT NULL COMMENT '关联设备ID',
    Mc4DeviceId     INT NOT NULL COMMENT 'MC4.0设备ID',
    PointIndex      INT DEFAULT 0 COMMENT '点位索引(子设备用)',
    PointTag        NVARCHAR(100) COMMENT '点位标签',
    Unit            NVARCHAR(50) COMMENT '单位(℃/%/V)',
    IsControlPoint  TINYINT DEFAULT 0 COMMENT '是否控制点(0只读/1可写)',
    ObjectType      INT COMMENT 'MC4.0对象类型',
    Tag             NVARCHAR(100) COMMENT '设备标签',
    ParentId        INT COMMENT 'MC4.0父级ID',
    Mc4Option       NVARCHAR(500) COMMENT 'MC4.0原始配置JSON',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    PRIMARY KEY (ExtId),
    INDEX IX_Device (DeviceId),
    INDEX IX_Mc4 (Mc4DeviceId)
) COMMENT '采集设备扩展表';

-- ============================================
-- 6. 设备数据归档表
-- DeviceId(INT) → Base_Device.DeviceId（直接指向子设备/点位）
-- ============================================
DROP TABLE IF EXISTS IoT_DeviceData;
CREATE TABLE IoT_DeviceData (
    DataId          INT AUTO_INCREMENT COMMENT '数据记录ID',
    DeviceId        INT NOT NULL COMMENT '关联设备ID(子设备/点位)',
    PointValue      DOUBLE COMMENT '点位数值',
    UpdateTime      DATETIME NOT NULL COMMENT '数据更新时间',
    `Interval`      INT DEFAULT 0 COMMENT '采集间隔(毫秒)',
    ArchiveType     INT DEFAULT 1 COMMENT '归档类型(1小时/2日)',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    PRIMARY KEY (DataId),
    INDEX IX_Device (DeviceId),
    INDEX IX_Time (CreateDate)
) COMMENT '设备数据归档表';

-- ============================================
-- 7. 告警记录表（通用）
-- DeviceId(INT) → Base_Device.DeviceId
-- ============================================
DROP TABLE IF EXISTS IoT_Alarm;
CREATE TABLE IoT_Alarm (
    AlarmId         INT AUTO_INCREMENT COMMENT '告警ID',
    SourceAlarmId   NVARCHAR(100) NOT NULL COMMENT '源系统告警ID',
    DeviceId        INT NOT NULL COMMENT '关联设备ID',
    AlarmType       INT DEFAULT 0 COMMENT '告警类型',
    AlarmLevel      INT DEFAULT 1 COMMENT '告警等级(1提示/2普通/3重要/4紧急)',
    AlarmDesc       NVARCHAR(500) COMMENT '告警描述',
    AlarmValue      DOUBLE COMMENT '触发值',
    StartTime       DATETIME NOT NULL COMMENT '告警开始时间',
    EndTime         DATETIME COMMENT '告警结束时间',
    ConfirmTime     DATETIME COMMENT '确认时间',
    ConfirmUser     NVARCHAR(50) COMMENT '确认人',
    State           INT DEFAULT 1 COMMENT '状态(1未确认/2已确认/3已结束)',
    AdapterCode     NVARCHAR(50) COMMENT '来源适配器',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    PRIMARY KEY (AlarmId),
    INDEX IX_Device (DeviceId),
    INDEX IX_Source (SourceAlarmId),
    INDEX IX_Time (StartTime),
    INDEX IX_Level (AlarmLevel)
) COMMENT '告警记录表';


-- ============================================
-- 8. 网关节点注册表
-- NodeCode=网关唯一编码  AdapterTypes=网关上报
-- ============================================
DROP TABLE IF EXISTS gateway_nodes;
CREATE TABLE gateway_nodes (
    NodeId          INT AUTO_INCREMENT COMMENT '网关节点ID',
    NodeCode        NVARCHAR(50) NOT NULL COMMENT '网关唯一编码',
    NodeName        NVARCHAR(100) NOT NULL COMMENT '网关名称',
    NodeToken       NVARCHAR(100) NOT NULL COMMENT '认证令牌',
    AdapterTypes    NVARCHAR(200) COMMENT '支持的适配器类型(网关上报)',
    BaseUrl         NVARCHAR(200) COMMENT '网关自身地址(网关上报)',
    LastHeartbeat   DATETIME COMMENT '上次心跳时间',
    IsOnline        TINYINT DEFAULT 0 COMMENT '在线状态(0离线/1在线)',
    Enable          TINYINT DEFAULT 1 COMMENT '启用(0禁用/1启用)',
    Remark          NVARCHAR(500) COMMENT '备注',
    CreateID        INT COMMENT '创建人ID',
    Creator         NVARCHAR(50) COMMENT '创建人',
    CreateDate      DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    ModifyID        INT COMMENT '修改人ID',
    Modifier        NVARCHAR(50) COMMENT '修改人',
    ModifyDate      DATETIME COMMENT '修改时间',
    PRIMARY KEY (NodeId),
    UNIQUE INDEX IX_Code (NodeCode),
    INDEX IX_Online (IsOnline)
) COMMENT '网关节点注册表';
